618 1810 2245 2525 2672 2975 3756 4790 5173 5678 6626

Depth(m)

Kings Triple Junction, Histogram Equalized Shaded Relief, Shading Azimuth 90

174˚ 30'W

174˚ 30'W

174˚ 00'W

174˚ 00'W

173˚ 30'W

173˚ 30'W

15˚ 30'S 15˚ 30'S

15˚ 00'S 15˚ 00'S

14˚ 30'S 14˚ 30'S

0 50 km