3000 3375 3750 4125 4500 4875 5250 5625 6000 6375 6750 7125 7500 7875 8250 8625 9000 9375 9750 101251050010875

Depth(m)

Horizon Deep (star), ODP Site 841 (circle)

175˚ 30'W

175˚ 30'W

175˚ 00'W

175˚ 00'W

23˚ 30'S 23˚ 30'S

23˚ 00'S 23˚ 00'S